-- --------------------------------------------------------
-- 主机:                           127.0.0.1
-- 服务器版本:                        8.0.31 - MySQL Community Server - GPL
-- 服务器操作系统:                      Win64
-- HeidiSQL 版本:                  11.3.0.6295
-- --------------------------------------------------------

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET NAMES utf8 */;
/*!50503 SET NAMES utf8mb4 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;

-- 导出  表 checkup_apm.ca_apm_config 结构
DROP TABLE IF EXISTS `ca_apm_config`;
CREATE TABLE IF NOT EXISTS `ca_apm_config` (
  `id` bigint NOT NULL COMMENT '主键',
  `is_deleted` int DEFAULT '0' COMMENT '删除标记, 0:否, 1:是',
  `create_user` bigint DEFAULT '0' COMMENT '创建人',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_user` bigint DEFAULT '0' COMMENT '更新人',
  `update_time` datetime DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  `dept_id` bigint DEFAULT NULL COMMENT '所属部门(医院)',
  `project` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '项目',
  `cu_addr` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '体检地址',
  `period` varchar(32) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '时段(上午,下午)',
  `apm_day` datetime DEFAULT NULL COMMENT '放号天',
  `time_frame` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '时段范围, 格式(HH:mm-HH:mm)',
  `number_num` int DEFAULT '0' COMMENT '放号数量',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='预约放号表';

-- 数据导出被取消选择。

-- 导出  表 checkup_apm.ca_apm_record 结构
DROP TABLE IF EXISTS `ca_apm_record`;
CREATE TABLE IF NOT EXISTS `ca_apm_record` (
  `id` bigint NOT NULL COMMENT '主键',
  `is_deleted` int DEFAULT '0' COMMENT '删除标记, 0:否, 1:是',
  `create_user` bigint DEFAULT '0' COMMENT '创建人',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_user` bigint DEFAULT '0' COMMENT '更新人',
  `update_time` datetime DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  `dept_id` bigint DEFAULT NULL COMMENT '所属部门(医院)',
  `project` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '项目',
  `cu_addr` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '体检地址',
  `period` varchar(32) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '时段(上午,下午)',
  `apm_day` datetime DEFAULT NULL COMMENT '放号天',
  `time_frame` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '时段范围, 格式(HH:mm-HH:mm)',
  `cup_name` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '体检人用户名',
  `cup_card_no` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '体检人证件号',
  `cup_phone` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '体检人联系方式',
  `apm_time` datetime DEFAULT NULL COMMENT '预约时间',
  `apm_status` int DEFAULT NULL COMMENT '预约状态, 0:已保存,1已取消,2:未报到, 3:已报到',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='预约记录表';

-- 数据导出被取消选择。

-- 导出  表 checkup_apm.ca_article 结构
DROP TABLE IF EXISTS `ca_article`;
CREATE TABLE IF NOT EXISTS `ca_article` (
  `id` bigint NOT NULL COMMENT '主键',
  `is_deleted` int DEFAULT '0' COMMENT '删除标记, 0:否, 1:是',
  `create_user` bigint DEFAULT '0' COMMENT '创建人',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_user` bigint DEFAULT '0' COMMENT '更新人',
  `update_time` datetime DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  `dept_id` bigint DEFAULT NULL COMMENT '所属部门(医院)',
  `title` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '标题',
  `content` text COLLATE utf8mb4_general_ci COMMENT '内容, 富文本',
  `publicsh_sta` int DEFAULT '0' COMMENT '发布状态, 0:已保存, 1:已发布, 2:已取消',
  `publish_time` datetime DEFAULT NULL COMMENT '发布时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='文章表';

-- 数据导出被取消选择。

-- 导出  表 checkup_apm.ca_blacklist 结构
DROP TABLE IF EXISTS `ca_blacklist`;
CREATE TABLE IF NOT EXISTS `ca_blacklist` (
  `id` bigint NOT NULL COMMENT '主键',
  `is_deleted` int DEFAULT '0' COMMENT '删除标记, 0:否, 1:是',
  `create_user` bigint DEFAULT '0' COMMENT '创建人',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_user` bigint DEFAULT '0' COMMENT '更新人',
  `update_time` datetime DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  `dept_id` bigint DEFAULT NULL COMMENT '所属部门(医院)',
  `cup_name` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '体检人用户名',
  `cup_card_no` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '体检人证件号',
  `cup_phone` varchar(64) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '体检人联系方式',
  `blacklist_time` varchar(32) COLLATE utf8mb4_general_ci DEFAULT '' COMMENT '拉黑时间, 格式yyyyMMdd',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='黑名单表';

-- 数据导出被取消选择。

/*!40101 SET SQL_MODE=IFNULL(@OLD_SQL_MODE, '') */;
/*!40014 SET FOREIGN_KEY_CHECKS=IFNULL(@OLD_FOREIGN_KEY_CHECKS, 1) */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40111 SET SQL_NOTES=IFNULL(@OLD_SQL_NOTES, 1) */;
