<template>
  <view class="page-css">
    <view class="page-header-txt">科研医疗建筑运维平台</view>
    <betone-list  ref="tablist"></betone-list>
    <betone-tabbar ref="tabbarRef" />
  </view>
</template>

<script>
export default {

  data() {
    return {
    };
  },
  computed: {

    dataTypes() {
      return this.$store.state.dataType
    },
  },
  onReachBottom() {
    uni.$emit('onReachBottom');

  },
  onPullDownRefresh() {
    uni.$emit('onPullDownRefresh');
  },
  onShow() {
    this.$nextTick(() => {
      this.$refs.tablist.getRecordsList()
      this.$refs.tabbarRef.getPermission();
     
    });
  },
  methods: {

  },
};
</script>

<style lang="scss" scoped>
.page-css {
  padding: 0;
  padding-top: var(--status-bar-height);
}
</style>