<template>
    <basic-container>
        <avue-crud :option="option" v-model:search="search" :table-loading="loading" :data="data" v-model:page="page" v-model="form" ref="crud"
            @row-update="rowUpdate" @row-save="rowSave" @row-del="rowDel" @search-change="searchChange"
            @search-reset="searchReset" @selection-change="selectionChange" @current-change="currentChange"
            @size-change="sizeChange" @refresh-change="refreshChange" @on-load="onLoad"
            @sort-change="sortChange"
            >
            <template #menu-left>
                <el-button type="primary" @click="batchSet()" v-if="permission.tankSolutionTaskDispose_batchFill">批量填报</el-button>
                <el-button type="primary" @click="checkFn()" v-if="permission.tankSolutionTaskDispose_check">审核</el-button>
                <el-button type="primary" @click="getMedicineFn()" v-if="permission.tankSolutionTaskDispose_medicine">领药</el-button>
            </template>
            <template #menu="scope">
                <el-button type="text" @click="handleView(scope.row, 'view')" v-if="permission.tankSolutionTaskDispose_detail">详情</el-button>
                <el-button type="text" @click="catchInfoFn(scope.row, 'add')"
                    v-show="(scope.row.status == 2 || scope.row.status == 4) && permission.tankSolutionTaskDispose_error">
                    异常
                </el-button>
                <!-- <el-button type="text" @click="handleView(scope.row, 'add')"
                    v-show="scope.row.status == 1 || scope.row.status == 4">
                    填报
                </el-button> -->
                <!-- <el-button type="text" v-show="scope.row.status == 3"
                    @click="handleView(scope.row, 'drug')">领药</el-button> -->
                <!-- <el-button type="text" v-show="scope.row.status == 2"
                    @click="checkFn(scope.row, 'check')">审核</el-button> -->
                <el-button type="text" v-show="scope.row.status == 1 && permission.tankSolutionTaskDispose_receive"
                    @click="receiveFn(scope.row, 'receive')">接收</el-button>
                    <!-- 组长可以转派 -->
                <el-button type="text" v-show="scope.row.status == 1 && permission.tankSolutionTaskDispose_redeploy"
                    @click="batchTestFn(scope.row, 'receive')">转派</el-button>
                <el-button type="text" v-show="scope.row.status == 6 && permission.tankSolutionTaskDispose_withdraw"
                    @click="revocationReview(scope.row, 'receive')">撤回</el-button>

            </template>
            <template #normValueLimit="{row}">
                {{row.normValueMin}} ~ {{row.normValueMax}}
            </template>
            <template #targetValueLimit="{row}">
                {{row.targetValueMin}} ~ {{row.targetValueMax}}
            </template>
            <template #qualified="scope">
                {{scope.row.qualified == 1 ? '合格' : scope.row.qualified == 2 ? '不合格' : ''}}
            </template>
            <!-- 测量值 -->
            <template #firstTestValue="scope">
                {{scope.row.firstTestValue}}{{scope.row.firstTestValue != '' ? scope.row.liquidTank ? scope.row.liquidTank.testUnit : '' : ''}}
            </template>
            <!-- 需添加量 -->
            <template #needAddValue="scope">
                {{scope.row.needAddValue}}{{scope.row.needAddValue != '' ? scope.row.liquidTank ? scope.row.liquidTank.addUnit : '' : ''}}
            </template>
            <!-- 实际添加量 -->
            <template #actualAddValue="scope">
                {{scope.row.actualAddValue}}{{scope.row.actualAddValue != '' ? scope.row.liquidTank ? scope.row.liquidTank.addUnit  : '' : ''}}
            </template>
            <!-- 复测测量值 -->
            <template #repeatTestValue="scope">
                {{scope.row.repeatTestValue}}{{scope.row.repeatTestValue != '' ? scope.row.liquidTank ? scope.row.liquidTank.testUnit : ''  : ''}}
            </template>
            <!-- <template #userId="{ row }">
                {{ row.testMan.userName }}
            </template>
            <template #taskMethod="{ row }">
                {{ row.taskMethodName }}
            </template> -->
        </avue-crud>
        <!-- 填报 -->
        <dispose-dialog v-if="showDialog" :dialog-type="dialogType" :show-dialog="showDialog" :row-id="rowId"
            :row-obj="rowObj" @closeDialog="closeDialog"></dispose-dialog>
        <!-- 批量填报 -->
        <batchDialog v-if="batchDialog" @closeDialog="closeDialog" :show-dialog="batchDialog" :list="batchList"></batchDialog>

        <!-- 转派 -->
         <dispatchTestDialog v-if="batchTestDialog" :row-id="rowId" @closeDialog="closeDialog" :show-dialog="batchTestDialog"></dispatchTestDialog>

         <!-- 审核 -->
          <checkDialog :list="selectionList" v-if="checkResultOpen" @closeDialog="closeDialog" :show-dialog="checkResultOpen"></checkDialog>

          <!-- 领药 -->
           <getMedicineDialog v-if="getMedicineOpen" @closeDialog="closeDialog" :show-dialog="getMedicineOpen" :list="selectionList"></getMedicineDialog>

           <!-- 异常 -->
        <catchInfoDialog v-if="catchInfoOpen" :row-id="rowId" @closeDialog="closeDialog" :show-dialog="catchInfoOpen"></catchInfoDialog>
    </basic-container>
</template>

<script>
import disposeDialog from './components/disposeDialog.vue';
import batchDialog from './components/batchDialog.vue';
import dispatchTestDialog from './components/dispatchTestDialog.vue'
import checkDialog from './components/checkDialog.vue'
import getMedicineDialog from './components/getMedicineDialog.vue'
import catchInfoDialog from './components/catchInfoDialog.vue'
import {getDealList,receiveTask,revokeDrug} from '@/api/tankSolutionSystem/tankSolutionTaskAssignment'
import { mapGetters } from 'vuex';
export default {
    components: {
        disposeDialog,
        batchDialog,
        dispatchTestDialog,
        checkDialog,
        getMedicineDialog,
        catchInfoDialog
    },
    data() {
        return {
            data: [],
            page: {
                pageSize: 10,
                currentPage: 1,
                total: 0,
            },
            search:{},
            taskId: null, // 存储从 state 传递的 id
            showDialog: false,
            rowId: '',
            rowObj: {},
            issueDialog: false,
            form: {},
            formRules: {
                userId: [{ required: true, message: '请选择检测员', trigger: 'blur' }],
            },
            query: {},
            loading: true,
            issueForm: {},
            option: {
                tip: false,
                height: 'auto',
                calcHeight: 32,
                // simplePage: true,
                searchShow: true,
                searchMenuSpan: 12,
                searchIcon: true,
                searchIndex: 3,
                columnSort: true,
                tree: false,
                border: true,
                index: false,
                selection: true,
                viewBtn: false,
                delBtn: false,
                addBtn: false,
                editBtn: false,
                editBtnText: '修改',
                viewBtnText: '详情',
                addBtnIcon: ' ',
                viewBtnIcon: ' ',
                delBtnIcon: ' ',
                editBtnIcon: ' ',
                labelWidth: 120,
                menuWidth: 160,
                dialogWidth: 600,
                dialogClickModal: false,
                searchEnter: true,
                filterBtn: false,
                searchShowBtn: false,
                excelBtn: true,
                showOverflowTooltip: true,
                align: 'center',
                searchLabelPosition: 'left',
                searchLabelPosition: 'left',
                searchGutter: 24,
                searchSpan: 6,
                menuAlign: 'left',
                gridBtn: false,
                searchMenuPosition: 'right',
                column: [
                    {
                        label: '任务编号',
                        prop: 'code',
                        search: false,
                        sortable: true,
                        filter: true,
                        addDisplay: false,
                        editDisplay: false,
                        viewDisplay: false,
                        span: 24,
                        width: 140,

                    },
                    {
                        label: '作业中心',
                        prop: 'workCenterId',
                        sortable: true,
                        filter: true,
                        span: 24,
                        search: true,
                        width: 140,
                        type: 'select',
                        // dicUrl: '/blade-desk/bsWorkCenter/getList',
                        dicUrl:'/blade-desk/BA/WorkCenter/listForSelect',
                        props: {
                            label: 'wcName',
                            value: 'id',
                        },
                    },
                    {
                        label: '槽号',
                        prop: 'workTankName',
                        search: false,
                        sortable: true,
                        filter: true,
                        // hide: true,
                        span: 24,
                        width: 140,

                    },
                    {
                        label: '分析项目',
                        prop: 'testElement',
                        type: 'textarea',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,

                    },
                    {
                        label: '药品名称',
                        prop: 'drugName',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '药品物料号',
                        prop: 'drugMaterialCode',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '药品物料名称',
                        prop: 'drugMaterialName',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '规范上下限',
                        prop: 'normValueLimit',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '目标上下限',
                        prop: 'targetValueLimit',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '目标值',
                        prop: 'targetValue',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '添加点',
                        prop: 'fillingLocation',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '测量值',
                        prop: 'firstTestValue',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '是否合格',
                        prop: 'qualified',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '电导率测量值',
                        prop: 'conductivityFirstTestValue',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '实测温度',
                        prop: 'temperatureActual',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '实测PH值',
                        prop: 'phActual',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '体积',
                        prop: 'volume',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '需添加量',
                        prop: 'needAddValue',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 220,
                    },
                    {
                        label: '实际添加量',
                        prop: 'actualAddValue',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 220,
                    },
                    {
                        label: '加药后理论值',
                        prop: 'afterAddTheoryValue',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 180,
                    },
                    {
                        label: '复测测量值',
                        prop: 'repeatTestValue',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 220,
                    },
                    {
                        label: '复测电导率测量值',
                        prop: 'conductivityRepeatTestValue',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 220,
                    },
                    {
                        label: '上次化验时间',
                        prop: 'firstTestDate',
                        type:'date',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 160,
                        format:"YYYY-MM-DD",
                        valueFormat:"YYYY-MM-DD",
                    },
                    {
                        label: '槽液到期时间',
                        prop: 'expiryDate',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 160,
                    },
                    // {
                    //     label: '槽液到期时间',
                    //     prop: 'userId',
                    //     search: false,
                    //     sortable: true,
                    //     filter: true,
                    //     span: 24,
                    //     width: 140,
                    // },

                    {
                        label: '化验人',
                        prop: 'testUserRealName',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '主管工艺',
                        prop: 'processUserRealName',
                        search: false,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                    },
                    {
                        label: '状态',
                        prop: 'statusValue',
                        search: true,
                        sortable: true,
                        filter: true,
                        span: 24,
                        width: 140,
                        type: 'select',
                        searchLabelWidth: 60,
                        dicUrl:'/api/blade-system/dict/dictionary?code= LiquidTankTask-Status',
                        props:{
                            label: 'dictValue',
                            value: 'dictKey',
                        }

                        // dicData: [
                        //     {
                        //         label: '待接收',
                        //         value: '1'
                        //     },
                        //     {
                        //         label: '待检测',
                        //         value: '2'
                        //     },
                        //     {
                        //         label: '待加药',
                        //         value: '2'
                        //     },
                        //     {
                        //         label: '待复测',
                        //         value: '2'
                        //     },
                        //     {
                        //         label: '已完成',
                        //         value: '2'
                        //     }
                        // ]
                    },
                    {
                        label: '对应班组',
                        prop: 'tsName',
                        search: false,
                        sortable: true,
                        editDisplay: false,
                        filter: true,
                        addDisplay: false,
                        span: 24,
                        width: 140,

                    },
                    {
                        label: '任务下发时间',
                        prop: 'createTime',
                        search: false,
                        sortable: true,
                        editDisplay: false,
                        filter: true,
                        addDisplay: false,
                        span: 24,
                        width: 160,

                    },
                    {
                        label: '任务完成时间',
                        prop: 'finishTime',
                        search: false,
                        sortable: true,
                        editDisplay: false,
                        filter: true,
                        addDisplay: false,
                        span: 24,
                        width: 160,

                    },
                ]
            },
            selectionList: [],
            batchList:[],
            dialogType: '',
            batchDialog: false,
            batchTestDialog:false,
            checkResultOpen:false,
            getMedicineOpen:false,
            catchInfoOpen:false,//异常
        }
    },
    computed: {
        ...mapGetters(['permission']),
    },
    created() { 
    // 获取通过 state 传递的 id
        const id = history.state?.id;
        if (id) {
            console.log('传递的 id:', id);
            this.taskId = id;
            // 使用 id 查询列表
            this.onLoad(this.page, { ...this.search, id });
        } else {
            // 如果没有 id，加载全部数据
            this.onLoad(this.page, this.search);
        }
    },
    mounted() {
    
    },
    methods: {
        // 字段排序
        sortChange({ prop, order }){
            this.query.descs = undefined;
            this.query.ascs = undefined;
            const orderByField = prop.replace(/([a-z])([A-Z0-9])/g, '$1_$2').toUpperCase()
            const orderByFieldKey = order === 'descending' ? 'descs' : 'ascs';
            this.query[orderByFieldKey] = !prop
                ? undefined
                : orderByField;
            this.onLoad(this.page, this.query);
        },
        // 异常
        catchInfoFn(row){
            this.rowId = row.id
            this.catchInfoOpen = true
        },
        // 领药
        getMedicineFn(){
            if(this.selectionList.length == 0){
                this.$message.error('请至少选择一条数据')
                return
            }
            let tmp = this.selectionList.find(item => item.status != 6)
            if(tmp){
                this.$message.error("请选择状态为【待领药】的数据")
                return
            }
            this.getMedicineOpen = true
        },
        checkFn(){
            if(this.selectionList.length == 0){
                this.$message.error('请至少选择一条数据')
                return
            }
            let tmp = this.selectionList.find(item => item.status != 5)
            if(tmp){
                this.$message.error("请选择状态为加药量待审核的数据")
                return
            }
            this.checkResultOpen = true
        },
        // 转派
        batchTestFn(row){
            this.rowId = row.id
            this.batchTestDialog = true
        },
        allStatusEqual(list) {
            if (list.length === 0) return true; // 空数组视为“相同”
            const firstStatus = list[0].status;
            return list.every(item => item.status === firstStatus);
        },
        batchSet() {
            if(this.selectionList.length == 0){
                this.$message.error('至少选择一条数据')
                return
            }
            let tmp = this.selectionList.find(item => item.status != 2 && item.status != 8 && item.status != 4)
            console.log('tmp-------------',tmp)
            if(tmp){
                this.$message.error('请选择状态均为【待填报】/【待复检】/【加药量待修改】的数据')
                return
            }

            let tmp1 = this.allStatusEqual(this.selectionList)
            console.log('tmp1-------------',tmp1)
            
            if(!tmp1){
                this.$message.error('请选择状态均为【待填报】/【待复检】/【加药量待修改】的数据')
                return
            }

            this.batchList = this.selectionList
            console.log('this.batchList',this.batchList)
            this.batchDialog = true
        },
        // 查看详情
        handleView(row, type) {
            this.dialogType = type
            this.rowId = row.id
            this.rowObj = row
            this.showDialog = true
        },
        // 关闭弹窗
        closeDialog(val) {
            this.batchDialog = false
            this.showDialog = false
            this.batchTestDialog = false
            this.checkResultOpen = false
            this.getMedicineOpen = false
            this.catchInfoOpen = false
            if(val){
                this.onLoad(this.page, { ...this.search, id: this.taskId })
            }
        },
        // 多选
        selectionChange(list) {
            console.log('list--------------',list)
            this.selectionList = list;
        },
        selectionClear() {
            this.selectionList = [];
            this.$refs.crud.toggleSelection();
        },
        rowUpdate(row, index, done, loading) {

        },
        rowSave(row, done, loading) {

        },
        // 批量下发
        handleIssue() {
            if (this.selectionList.length == 0) {
                this.$message.error('请至少选择一条数据')
            } else {
                this.issueDialog = true
            }
        },
        // 单个下发
        issueRow(row) {
            this.issueDialog = true
        },
        searchReset() {
            this.query = {};
            this.onLoad(this.page);
        },
        searchChange(params, done) {
            this.query = params;
            this.page.currentPage = 1;
            this.onLoad(this.page, params);
            done();
        },
        receiveFn(row, index, done) {
            this.$confirm('确定接收任务吗?', {
                confirmButtonText: '确定',
                cancelButtonText: '取消',
                type: 'warning',
            }).then(() => {
                receiveTask({id:row.id}).then(res =>{
                    if(res.data.code == 200){
                        this.$message.success('接收成功')
                        this.onLoad(this.page, { ...this.search, id: this.taskId })
                    }
                })
            })
        },
        revocationReview(row) {
            //  this.$confirm('确认是否撤销审核通过的数据?', {
            //     confirmButtonText: '确定',
            //     cancelButtonText: '取消',
            //     type: 'warning',
            // }).then(() => {

            // })
            this.$prompt('请输入原因', '提示', {
                confirmButtonText: '确定',
                cancelButtonText: '取消',
                inputValidator: (value) => {//校验
                    if (!value) {
                        return '输入内容不能为空！'
                    }
                }
            }).then(({ value }) => {
                revokeDrug({
                    revokeReason:value,
                    id:row.id
                }).then(res =>{
                    if(res.data.code == 200){
                        this.$message({
                            type: 'success',
                            message: '撤回成功'
                        });
                        this.onLoad(this.page, { ...this.search, id: this.taskId ,})
                    }
                })

                

            }).catch(() => {
                this.$message({
                    type: 'info',
                    message: '取消输入'
                });
            });
        },
        reportFn() {
            this.$confirm('是否下载检验报告?', {
                confirmButtonText: '确定',
                cancelButtonText: '取消',
                type: 'warning',
            }).then(() => {

            })
        },
        rowDel(row, index, done) {
            this.$confirm('确定将选择数据删除?', {
                confirmButtonText: '确定',
                cancelButtonText: '取消',
                type: 'warning',
            }).then(() => {

            })
        },
        // 下发
        submit() {
            this.$refs.issueForm.validate(valid => {
                if (valid) {
                    this.issueDialog = false
                }
            })
        },
        currentChange(currentPage) {
            this.page.currentPage = currentPage;
        },
        sizeChange(pageSize) {
            this.page.pageSize = pageSize;
        },
        refreshChange() {
            this.onLoad(this.page, this.query);
        },
        onLoad(page, params) {
            console.log('sear-------------', this.search)
            this.loading = true
            getDealList({
                current: page?.currentPage || this.page.currentPage,
                size: page?.pageSize || this.page.pageSize,
                ...this.query,
                status: params?.statusValue || this.search.statusValue,
                workCenterId: params?.workCenterId || this.search.workCenterId,
                id: params?.id || this.taskId, // 添加 id 参数
            }).then(res =>{
                // res.data.data.records.map(item =>{
                //     item.liquidTank = null
                // })
                this.data = res.data.data.records

                this.data.map(item =>{
                    if(item.status == 2 || item.status == 1){
                        item.firstTestValue = ''
                        item.conductivityFirstTestValue = ''
                        item.temperatureActual = ''
                        item.phActual = ''
                        item.needAddValue = ''
                        item.actualAddValue = ''
                        item.afterAddTheoryValue = ''
                        item.repeatTestValue = ''
                        item.conductivityRepeatTestValue = ''
                    }
                })
                this.page.total = res.data.data.total
                this.loading = false
            })
            // this.data = [
            //     {
            //         id: '6',
            //         taskCode: 'CYSYXXXXXXXXX',
            //         slotNo: '#25', wcName: '化学镀镍作业中心', testEle: '氰化钠',
            //         proContent: 32,
            //         targetValue: 40,
            //         targetLowerLimit: 4,
            //         drugMatterCode: 'XXXX',
            //         drugName: 'XXXX',
            //         addPoints: 45,
            //         drugMatterName: "XXXX",
            //         targetUpperLimit: 45,
            //         testMan: {
            //             userId: '',
            //             userName: '张三',
            //             testEle: '张三'
            //         }, taskMethod: 1, taskMethodName: '需求生成',
            //         status: 0,
            //         statusName: '待接收',
            //         taskTime: '2025-01-22 12:23:35',
            //         testTime: '2025-01-22',
            //         needAdd: 444,
            //         actualAdd: 444,
            //         initialInspectionTime: '2025-01-23 11:12:23',
            //         finishTime: '',
            //         finishReason: '',
            //         meterNum: 32,
            //         condNum: 181,
            //         auditResult: 1,
            //         auditResultName: '审核通过',
            //         auditOpinion: '审核通过',
            //         auditUser: '张三',
            //         auditTime: '2025-01-25 15:33:26',
            //         drugBatch: '1002',
            //         drugRecipient: '',
            //         drugRecipientName: '张三',
            //         drugTime: '2025-01-25 11:23:56',
            //         meterNumTwo: 32,
            //         condNumTwo: 32,
            //         recheckUser: '李四',
            //         recheckTime: '2025-01-26 11:23:23',
            //         recheckSubmit: '2025-01-26 11:23:23'
            //     },
            //     {
            //         id: '1',
            //         taskCode: 'CYSYXXXXXXXXX',
            //         slotNo: '#21', wcName: '化学镀镍作业中心', testEle: '氰化钠',
            //         proContent: 32,
            //         targetValue: 40,
            //         targetLowerLimit: 4,
            //         drugMatterCode: 'XXXX',
            //         drugName: 'XXXX',
            //         addPoints: 45,
            //         drugMatterName: "XXXX",
            //         targetUpperLimit: 45,
            //         testMan: {
            //             userId: '',
            //             userName: '张三',
            //             testEle: '张三'
            //         }, taskMethod: 1, taskMethodName: '周期生成',
            //         status: 1,
            //         statusName: '待检测',
            //         taskTime: '2025-01-22 12:23:35',
            //         testTime: '2025-01-22',
            //         needAdd: 444,
            //         actualAdd: 444,
            //         initialInspectionTime: '2025-01-23 11:12:23',
            //         finishTime: '',
            //         finishReason: '',
            //         meterNum: 32,
            //         condNum: 181,
            //         auditResult: 1,
            //         auditResultName: '审核通过',
            //         auditOpinion: '审核通过',
            //         auditUser: '张三',
            //         auditTime: '2025-01-25 15:33:26',
            //         drugBatch: '1002',
            //         drugRecipient: '',
            //         drugRecipientName: '张三',
            //         drugTime: '2025-01-25 11:23:56',
            //         meterNumTwo: 32,
            //         condNumTwo: 32,
            //         recheckUser: '李四',
            //         recheckTime: '2025-01-26 11:23:23',
            //         recheckSubmit: '2025-01-26 11:23:23'
            //     },
            //     {
            //         id: '2',
            //         taskCode: 'CYSYXXXXXXXXX',
            //         slotNo: '#22', wcName: '化学镀镍作业中心', testEle: '氰化钠',
            //         proContent: 32,
            //         targetValue: 40,
            //         targetLowerLimit: 4,
            //         drugMatterCode: 'XXXX',
            //         drugName: 'XXXX',
            //         addPoints: 45,
            //         drugMatterName: "XXXX",
            //         targetUpperLimit: 45,
            //         testMan: {
            //             userId: '',
            //             userName: '张三',
            //             testEle: '张三'
            //         }, taskMethod: 1, taskMethodName: '周期生成',
            //         status: 4,
            //         statusName: '待复检',
            //         taskTime: '2025-01-22 12:23:35',
            //         testTime: '2025-01-22',
            //         needAdd: 444,
            //         actualAdd: 444,
            //         initialInspectionTime: '2025-01-23 11:12:23',
            //         finishTime: '',
            //         finishReason: '',
            //         meterNum: 32,
            //         condNum: 181,
            //         auditResult: 1,
            //         auditResultName: '审核通过',
            //         auditOpinion: '审核通过',
            //         auditUser: '张三',
            //         auditTime: '2025-01-25 15:33:26',
            //         drugBatch: '1002',
            //         drugRecipient: '',
            //         drugRecipientName: '张三',
            //         drugTime: '2025-01-25 11:23:56',
            //         meterNumTwo: 32,
            //         condNumTwo: 32,
            //         recheckUser: '李四',
            //         recheckTime: '2025-01-26 11:23:23',
            //         recheckSubmit: '2025-01-26 11:23:23'
            //     },
            //     {
            //         id: '3',
            //         taskCode: 'CYSYXXXXXXXXX',
            //         slotNo: '#23', wcName: '化学镀镍作业中心', testEle: '氰化钠',
            //         proContent: 32,
            //         targetValue: 40,
            //         targetLowerLimit: 4,
            //         drugMatterCode: 'XXXX',
            //         drugName: 'XXXX',
            //         addPoints: 45,
            //         drugMatterName: "XXXX",
            //         targetUpperLimit: 45,
            //         testMan: {
            //             userId: '',
            //             userName: '张三',
            //             testEle: '张三'
            //         }, taskMethod: 1, taskMethodName: '周期生成',
            //         status: 5,
            //         statusName: '已完成',

            //         taskTime: '2025-01-22 12:23:35',
            //         testTime: '2025-01-22',
            //         needAdd: 444,
            //         actualAdd: 444,
            //         initialInspectionTime: '2025-01-23 11:12:23',
            //         finishTime: '',
            //         finishReason: '',
            //         meterNum: 32,
            //         condNum: 181,
            //         auditResult: 1,
            //         auditResultName: '审核通过',
            //         auditOpinion: '审核通过',
            //         auditUser: '张三',
            //         auditTime: '2025-01-25 15:33:26',
            //         drugBatch: '1002',
            //         drugRecipient: '',
            //         drugRecipientName: '张三',
            //         drugTime: '2025-01-25 11:23:56',
            //         meterNumTwo: 32,
            //         condNumTwo: 32,
            //         recheckUser: '李四',
            //         recheckTime: '2025-01-26 11:23:23',
            //         recheckSubmit: '2025-01-26 11:23:23'
            //     },
            //     {
            //         id: '4',
            //         taskCode: 'CYSYXXXXXXXXX',
            //         slotNo: '#24', wcName: '化学镀镍作业中心', testEle: '氰化钠',
            //         proContent: 32,
            //         targetValue: 40,
            //         targetLowerLimit: 4,
            //         drugMatterCode: 'XXXX',
            //         drugName: 'XXXX',
            //         addPoints: 45,
            //         drugMatterName: "XXXX",
            //         targetUpperLimit: 45,
            //         testMan: {
            //             userId: '',
            //             userName: '张三',
            //             testEle: '张三'
            //         }, taskMethod: 1, taskMethodName: '周期生成',
            //         status: 3,
            //         statusName: '待加药',
            //         taskTime: '2025-01-22 12:23:35',
            //         testTime: '2025-01-22',
            //         needAdd: 444,
            //         actualAdd: 444,
            //         initialInspectionTime: '2025-01-23 11:12:23',
            //         finishTime: '',
            //         finishReason: '',
            //         meterNum: 32,
            //         condNum: 181,
            //         auditResult: 1,
            //         auditResultName: '审核通过',
            //         auditOpinion: '审核通过',
            //         auditUser: '张三',
            //         auditTime: '2025-01-25 15:33:26',
            //         drugBatch: '1002',
            //         drugRecipient: '',
            //         drugRecipientName: '张三',
            //         drugTime: '2025-01-25 11:23:56',
            //         meterNumTwo: 32,
            //         condNumTwo: 32,
            //         recheckUser: '李四',
            //         recheckTime: '2025-01-26 11:23:23',
            //         recheckSubmit: '2025-01-26 11:23:23'
            //     },
            //     {
            //         id: '5',
            //         taskCode: 'CYSYXXXXXXXXX',
            //         slotNo: '#25', wcName: '化学镀镍作业中心', testEle: '氰化钠',
            //         proContent: 32,
            //         targetValue: 40,
            //         targetLowerLimit: 4,
            //         drugMatterCode: 'XXXX',
            //         drugName: 'XXXX',
            //         addPoints: 45,
            //         drugMatterName: "XXXX",
            //         targetUpperLimit: 45,
            //         testMan: {
            //             userId: '',
            //             userName: '张三',
            //             testEle: '张三'
            //         }, taskMethod: 1, taskMethodName: '需求生成',
            //         status: 2,
            //         statusName: '加药量待审核',
            //         taskTime: '2025-01-22 12:23:35',
            //         testTime: '2025-01-22',
            //         needAdd: 444,
            //         actualAdd: 444,
            //         initialInspectionTime: '2025-01-23 11:12:23',
            //         finishTime: '',
            //         finishReason: '',
            //         meterNum: 32,
            //         condNum: 181,
            //         auditResult: 1,
            //         auditResultName: '审核通过',
            //         auditOpinion: '审核通过',
            //         auditUser: '张三',
            //         auditTime: '2025-01-25 15:33:26',
            //         drugBatch: '1002',
            //         drugRecipient: '',
            //         drugRecipientName: '张三',
            //         drugTime: '2025-01-25 11:23:56',
            //         meterNumTwo: 32,
            //         condNumTwo: 32,
            //         recheckUser: '李四',
            //         recheckTime: '2025-01-26 11:23:23',
            //         recheckSubmit: '2025-01-26 11:23:23'
            //     },
            //     {
            //         id: '6',
            //         taskCode: 'CYSYXXXXXXXXX',
            //         slotNo: '#25', wcName: '化学镀镍作业中心', testEle: '氰化钠',
            //         proContent: 32,
            //         targetValue: 40,
            //         targetLowerLimit: 4,
            //         drugMatterCode: 'XXXX',
            //         drugName: 'XXXX',
            //         addPoints: 45,
            //         drugMatterName: "XXXX",
            //         targetUpperLimit: 45,
            //         testMan: {
            //             userId: '',
            //             userName: '张三',
            //             testEle: '张三'
            //         }, taskMethod: 1, taskMethodName: '需求生成',
            //         status: 6,
            //         statusName: '加药量待审核',
            //         taskTime: '2025-01-22 12:23:35',
            //         testTime: '2025-01-22',
            //         needAdd: 444,
            //         actualAdd: 444,
            //         initialInspectionTime: '2025-01-23 11:12:23',
            //         finishTime: '',
            //         finishReason: '',
            //         meterNum: 32,
            //         condNum: 181,
            //         auditResult: 1,
            //         auditResultName: '审核通过',
            //         auditOpinion: '审核通过',
            //         auditUser: '张三',
            //         auditTime: '2025-01-25 15:33:26',
            //         drugBatch: '1002',
            //         drugRecipient: '',
            //         drugRecipientName: '张三',
            //         drugTime: '2025-01-25 11:23:56',
            //         meterNumTwo: 32,
            //         condNumTwo: 32,
            //         recheckUser: '李四',
            //         recheckTime: '2025-01-26 11:23:23',
            //         recheckSubmit: '2025-01-26 11:23:23'
            //     },

            // ]
            // this.page.total = this.data.length
            // this.loading = false
            // setTimeout(() => {
            //     this.selectionClear();
            // }, 500)
        }
    }
}
</script>

<style></style>