--修改字段类型长度
ALTER TABLE MES_MEASURING_UPKEEP
    MODIFY (MI_ID NUMBER (20,0))
    MODIFY (CREATE_MAN NUMBER (20,0))
    MODIFY (RLS_ID NUMBER (20,0));